= Fedora Infrastructure Machine Classes

== Contact Information

Owner::
  sysadmin-main, application developers
Contact::
  sysadmin-main
Location::
  Everywhere we have machines.
Servers::
  publictest, dev, staging, production
Purpose::
  Explain our use of various types of machines.

== Introduction

This document explains what are various types of machines are used for
in the life cycle of providing an application or resource.

== Public Test machines

publictest instances are used for early investigation into a resource or
application. At this stage the application might not be packaged yet,
and we want to see if it's worth packaging and starting it on the
process to be available in production. These machines are accessable to
anyone in the sysadmin-test group, and coordination of use of instances
is done on an ad-hock basis. These machines are re-installed every cycle
cleanly, so all work must be saved before this occurs.

Authentication must not be against the production fas server. We have
fakefas.fedoraproject.org setup for these systems instead.

[NOTE]
.Note
====
We're planning on merging publictest into the development servers.
Environment-wise they'll be mostly the same (one service per machine, a
group to manage them, no proxy interaction, etc) Service by service
we'll assign timeframes to the machines before being rebuilt,
decommissioned if no progress, etc.
====
== Development

These instances are for applications that are packaged and being
investigated for deployment. Typically packages and config files are
modified locally to get the application or resource working. No caching
or proxies are used. Access is to a specific sysadmin group for that
application or resource. These instances can be re-installed on request
to 'start over' getting configration ready.

Some services hosted on dev systems are for testing new programs. These
will usually be associated with an RFR and have a limited lifetime
before the new service has to prove itself worthy of continued testing,
to be moved on to stg, or have the machine decommissioned. Other
services are for developing existing services. They are handy if the
setup of the service is tricky or lengthy and the person in charge wants
to maintain the .dev server so that newer contributors don't have to
perform that setup in order to work on the service.

Authentication must not be against the production fas server. We have
fakefas.fedoraproject.org setup for these systems instead.

[NOTE]
.Note
====
fakefas will be renamed fas01.dev at some point in the future
====
== Staging

These instances are used to integrate the application or resource into
ansible as well as proxy and caching setups. These instances should use
ansible to deploy all parts of the application or resource possible.
Access to these instances is only to a sysadmin group for that
application, who may or may not have sudo access. Permissions on stg
mirror permissions on production (for instance, sysadmin-web would have
access to the app servers in stg the same as production).

== Production

These instances are used to serve the ready for deployment application
to the public. All changes are done via ansible and access is
restricted. Changes should be done here only after testing in staging.
