[[enabling-latest-virtio-win-repo]]
= Enabling the latest Windows VirtIO Repository

By default, the *virtio-win-latest* repository is disabled and *virtio-win-stable* repo is enabled.

To enable the *virtio-win-latest* repo with DNF:

----
# dnf --enablerepo=virtio-win-latest upgrade virtio-win
----
